Table 12: Lorenz Curve Decile Shares of IEI for AIDS Model, With and Without Homogeneity and Symmetry,1978–1986 and Test Statistics for Differences in Shares.

Homogeneity and Symmetry Imposed:

Decile Shares (%) Test Statistics for Years Compared Decile 1978 1982 1984 1986 1978–1982 1982–1984 1984–1986 1978–1986

1 0.815 0.760 0.828 0.765 -1.829 2.041 -1.936 -1.711 2 1.957 1.806 1.971 1.562 -1.637 1.559 -4.259 -4.895 3 3.802 3.644 3.705 4.155 -1.132 0.384 2.448 2.119 4 5.806 5.580 5.802 4.253 -1.750 1.418 -9.114 -10.692 5 7.713 7.662 7.599 7.158 -0.419 -0.474 -3.237 -4.457 6 9.525 9.614 9.376 9.150 0.787 -1.717 -1.577 -3.162 7 11.562 11.826 11.395 11.476 2.193 -3.190 0.556 -0.658 8 13.843 14.290 14.030 14.326 3.273 -1.560 1.678 3.256 9 17.715 18.159 17.879 18.651 2.285 -1.284 3.388 4.558 10 27.261 26.658 27.415 28.505 -1.416 1.563 2.187 2.810

Homogeneity and Symmetry Relaxed:

Decile Shares (%) Test Statistics for Years Compared Decile 1978 1982 1984 1986 1978–1982 1982–1984 1984–1986 1978–1986

1 0.797 0.744 0.808 0.748 -1.798 1.980 -1.894 -1.702 2 1.927 1.778 1.931 1.534 -1.678 1.486 -4.242 -5.087 3 3.727 3.580 3.643 4.067 -1.063 0.393 2.320 2.076 4 5.681 5.474 5.737 4.171 -1.588 1.664 -9.245 -10.484 5 7.563 7.517 7.527 7.012 -0.368 0.071 -3.635 -4.262 6 9.360 9.490 9.243 8.993 1.108 -1.785 -1.789 -3.102 7 11.507 11.705 11.259 11.380 1.624 -3.261 0.813 -0.938 8 13.836 14.252 14.002 14.274 2.957 -1.428 1.503 2.966 9 17.814 18.288 17.894 18.708 2.419 -1.813 3.502 4.208 10 27.789 27.172 27.957 29.114 -1.413 1.550 2.224 2.931