Table 11: Lorenz Curve Decile Shares of IEI for JLS Model, With and Without Homogeneity and Symmetry,1978–1986 and Test Statistics for Differences in Shares.

Homogeneity and Symmetry Imposed:

Decile Shares (%) Test Statistics for Years Compared Decile 1978 1982 1984 1986 1978–1982 1982–1984 1984–1986 1978–1986

1 0.459 0.457 0.424 0.447 -0.078 -1.527 1.059 -0.578 2 0.989 0.900 0.964 0.951 -2.509 1.457 -0.275 -0.992 3 1.666 1.465 1.723 1.976 -3.467 3.634 2.992 4.185 4 2.702 2.444 2.699 2.253 -2.487 2.183 -3.688 -4.144 5 4.494 4.003 4.252 4.255 -3.009 1.498 0.017 -1.507 6 6.980 6.225 6.153 6.676 -4.096 -0.382 2.637 -1.555 7 9.936 9.018 9.422 9.505 -4.348 1.495 0.308 -2.051 8 13.797 13.630 13.735 13.702 -0.662 0.369 -0.118 -0.380 9 19.964 20.690 20.253 20.980 2.197 -1.135 1.896 3.090 10 39.014 41.168 40.374 39.254 2.633 -0.906 -1.308 0.301

Homogeneity and Symmetry Relaxed:

Decile Shares (%) Test Statistics for Years Compared Decile 1978 1982 1984 1986 1978–1982 1982–1984 1984–1986 1978–1986

1 0.001 0.000 0.000 0.000 -0.957 0.332 -5.558 -6.607 2 0.003 0.003 0.002 0.001 -0.556 -1.991 -5.923 -7.209 3 0.011 0.010 0.008 0.005 -0.476 -1.884 -2.479 -5.138 4 0.029 0.026 0.030 0.008 -0.848 1.036 -5.985 -7.238 5 0.066 0.068 0.082 0.027 0.246 1.415 -6.289 -6.067 6 0.151 0.167 0.197 0.078 0.816 1.227 -5.448 -4.497 7 0.415 0.462 0.517 0.239 0.826 0.864 -4.969 -3.839 8 1.438 1.626 1.687 0.702 1.011 0.278 -5.267 -4.854 9 6.061 5.717 6.781 2.660 -0.562 1.541 -6.741 -6.530 10 91.826 91.921 90.696 96.280 0.113 -1.302 6.766 6.267