Table 10: Test Statistics for Significant Differences in Lorenz Curve Ordinate Vectors in Various Years, JLS and AIDS Models With and Without Restrictions. F3 Households Only.

Years Compared Model 1978–1982 1982–1984 1984–1986 1978–1986

JLS+HS 5.006 7.675 12.278 11.520 (0.834) (0.567) (0.151) (0.242)

JLS-HS 13.429 27.384 63.191 32.523 (0.144) (0.001) (0.000) (0.000)

AIDS+HS 22.237 19.835 6.092 17.471 (0.008) (0.019) (0.731) (0.042)

AIDS-HS 18.803 20.875 7.474 10.611 (0.027) (0.013) (0.588) (0.303)