Notes to Tables 1. All test statistics are for differences in sample means, and are asymptotically distributed as standard Normal random variates.

2. The CDF column in the tables indicates the cumulative density for the indicated test statistics. 3. Expenditure category details are given in the Appendix, Table A1.

4. Shares do not add up to unity, since TEXP includes expenditures on more categories than are included in the tables.